0 5 10 15 0.3 0.31

0.32

Iteration No.

RMS Error

SNR=10 dB

LK-GN LK-LM LKSSIM-LM

0 5 10 15

0.285

0.29

0.295 0.3

Iteration No.

SNR=90 dB

LK-GN LK-LM LKSSIM-LM